| < 1.5) η (|_{ch}N

Generated

0 20 40 60 80 100 120 140 160 180

Ratio

0.95 1 1.050 20 40 60 80 100 120 140 160 180

〉_{ch}N〈

Measured

20 40 60 80 100 120 ALICE simulation Generated Linear function

| < 1.5) η (|_{ch}N

Generated

0 20 40 60 80 100 120 140 160 180

Ratio

0.8 0.9 1 1.1 1.20 20 40 60 80 100 120 140 160 180 chNσ

Measured

2 4 6 8 10 12 ALICE simulation

Generated Pade Power law